*******************************************************************************
* For reference the following is a text-only version of the Zint manual,      *
* generated from "docs/manual.pmd" by pandoc.                                 *
* A HTML version can be accessed at https://zint.org.uk/manual/               *
* however this text file is more likely to be up-to-date.                     *
*******************************************************************************
